I have the same issue on all websites using Firefox. This problem is exclusive to Firefox and scroll

I have the same issue on all websites using Firefox. This problem is exclusive to Firefox and scrolling with the middle mouse button still works with Chrome. I have not modified any software related to my mouse and have never set up features like having different button layouts based on app use.