It doesn't appear that the entire troubleshooting log was included in my last post. Here are the log

It doesn't appear that the entire troubleshooting log was included in my last post. Here are the log entries after the printer documentation:

Graphics

Adapter Description: Intel(R) HD Graphics 4400 Vendor ID: 0x8086 Device ID: 0x041e Adapter RAM: Unknown Adapter Drivers: igdumdim64 igd10iumd64 igd10iumd64 igdumdim32 igd10iumd32 igd10iumd32 Driver Version: 9.18.10.3272 Driver Date: 8-8-2013 Direct2D Enabled: false DirectWrite Enabled: false (6.2.9200.21976) ClearType Parameters: ClearType parameters not found WebGL Renderer: Google Inc. -- ANGLE (Intel(R) HD Graphics 4400 Direct3D11 vs_5_0 ps_5_0) -- OpenGL ES 2.0 (ANGLE 2.1.0.316930d51ea9) GPU Accelerated Windows: 0

AzureCanvasBackend: skia AzureSkiaAccelerated: 0 AzureFallbackCanvasBackend: cairo AzureContentBackend: cairo

JavaScript

Incremental GC: 1

Accessibility

Activated: 0 Prevent Accessibility: 0

Library Versions

Expected minimum version Version in use

NSPR 4.12 4.12

NSS 3.21.3 Basic ECC 3.21.3 Basic ECC

NSS Util 3.21.3 3.21.3

NSS SSL 3.21.3 Basic ECC 3.21.3 Basic ECC

NSS S/MIME 3.21.3 Basic ECC 3.21.3 Basic ECC