Hey sorry haha I figured it out, I had just recently updated the change. I was using my C drive as t

Hey sorry haha I figured it out, I had just recently updated the change. I was using my C drive as the directory of the file for the HTML code and not the http://etc as the source as you have mentioned above... IE was not sensative to it but Firefox was. Thank you for the post ;0