There ids an error in the SRC of that missing image SRC="http://maryland.dyndns-server.com:123.../WO

There ids an error in the SRC of that missing image

SRC="http://maryland.dyndns-server.com:123.../WOW1.jpg" instead of:

http://maryland.dyndns-server.com:123.../WOW1.jpg