A large mbox file may take a while for TB to index on the first restart, but afterwards there should

A large mbox file may take a while for TB to index on the first restart, but afterwards there should be no performance issues as long as you follow the general recommendation to exclude the profile folder from antivirus scanning.

http://kb.mozillazine.org/Antivirus_software