The Tab bar normally consists of one line, so I assume that you use an extension to expand the Tab b

The Tab bar normally consists of one line, so I assume that you use an extension to expand the Tab bar if you have more lines with tabs.

In that case you need to check the settings in that extension or use code in userChrome.css that works with that extension.