Hey Ty, bokifirefox There are some interesting things with uploads, sometimes I would assume that th

Hey Ty, bokifirefox There are some interesting things with uploads, sometimes I would assume that there is just a limit in the chunks of the file uploaded at a time. However sometimes specific sites have limits as well. And some sites use different methods.

In the past Firefox has a bug that is now fixed uploading large files so this may be difficult to troubleshoot. I would image, since there is not a client/Firefox upload limit, its the website/router etc. Ask your isp as well.