Hi, I have updated Widevine to the newest version and Netflix player is now working. However, when

Hi,

I have updated Widevine to the newest version and Netflix player is now working. However, when I go to full screen mode the screen will intermittently flash all black for a quick instant at a time. This will happen regularly about every 15 seconds. This has never happened before and full screen mode works with other services such as youtube without the intermittent black outs. Has anyone ever had this happen before?? What should I do?

Thank you, Kyle