Further information: On my system: C:\Windows\System32&gt;NSLOOKUP Default Server: mygateway Addres

Further information: On my system: C:\Windows\System32>NSLOOKUP Default Server: mygateway Address: fe80::be30:d9ff:fee2:e2e0

NSLOOKUP google.com.au Server: google.com.au Addresses: 2404:6800:4006:804::2003

172.217.24.35

DNS request timed out.

timeout was 2 seconds.

DNS request timed out.

timeout was 2 seconds.

Request to google.com.au timed-out

Is that helpful ?? If I directly ask Firefox to go to 172.217.24.35 - google loads as normal, so ???? NOW WHAT ?? Regards, DougH