Checked firewall. Checked settings. Still says: Sending of the message failed. The message could not

Checked firewall. Checked settings. Still says:

Sending of the message failed. The message could not be sent because the connection to Outgoing server (SMTP) mail.orcon.net.nz timed out. Try again