We have just gone through all the settings for the smtp server. It is smtp.orcon.net.nz port 465 SSL

We have just gone through all the settings for the smtp server. It is smtp.orcon.net.nz port 465 SSL/TLS. Tried no password, password, encrypted. Turned off antivirus and firewall.

Now it says: Sending of the message failed. The message could not be sent because the connection to Outgoing server (SMTP) mail.orcon.net.nz timed out. Try again.

(