An extension installed globally for all users (in /usr/share/mozilla/extensions) does not load for an unobvious reason

I need to automate the deployment of Firefox along with the extensions. I put three extensions (uBlock, Translate Web Pages, and Auto Tab Discard) in the /usr/share/mozilla/extensions/{ec8030f7-c20a-464f-9b0e-13a3a9e97384}/. All extensions load normally, except Auto Tab Discard. When running firefox with the -jsconsole option, I see what the screenshot shows (the message "Invalid addon ID"). But the installation to user profile is successful. I add the extension ID to manifest.json, and get the following output in the console: addons.xpi-utils WARN addMetadata: Add-on {c2c003ee-bd69-42a2-b0e9-6f34222cb046} is invalid: Error: File /usr/share/mozilla/extensions/{ec8030f7-c20a-464f-9b0e-13a3a9e97384}/{c2c003ee-bd69-42a2-b0e9-6f34222cb046} does not contain a valid manifest(resource://gre/modules/addons/XPIInstall.jsm:669:11) What can go wrong?

System: Debian 11 (bullseye) Firefox version: 91.4.1esr (amd64)

If you need any other information, please ask, I will write it down.